\begin{thebibliography}{1}

\bibitem{bank-trbdf}
{R.E.} Bank et~al.
\newblock Transient simulation of silicon devices and circuits.
\newblock {\em IEEE Transactions on Electron Devices}, 32(10):1992--2007, Oct.
  1985.

\bibitem{hughes-fem}
Thomas J.~R. Hughes.
\newblock {\em The Finite Element Method: Linear Static and Dynamic Finite
  Element Analysis}.
\newblock Prentice Hall, Englewood Cliffs, NJ, 1987.

\bibitem{ousterhout-tcl}
{John K.} Ousterhout.
\newblock {\em Tcl and the Tk Toolkit}.
\newblock Addison-Wesley, 1994.

\bibitem{yeager-milne}
{H.R.} Yeager and {R.W} Dutton.
\newblock An approach to solving multiparticle diffusion exhibiting nonlinear
  stiff coupling.
\newblock {\em IEEE Transactions on Electron Devices}, 32(10):1964--1976, Oct.
  1985.

\end{thebibliography}
